50 100 150 0 5 10 15 20 STether gain

Yearday ’94 eng units

50 100 150 70 75 80 85 90 STether Ambient Noise

Yearday ’94 db

50 100 150 12 12.5 13 13.5 14 STether Internal Temperature

Yearday ’94 deg (c)

50 100 150 12 12.5 13 13.5 14 STether External Temperature

Yearday ’94

50 100 150 820 822 824 826 828 830 STether Internal Pressure

Yearday ’94 mbars

50 100 150 138 140 142 144 146 STether External Pressure

Yearday ’94 dbars

15-Jun-94

50 100 150 35

40

45 STether Battery Voltage

Yearday ’94 volts

50 100 150 10 12 14 16 18 20 STether System Voltage

Yearday ’94

50 100 150 15

20

25 STether Bridge Voltage

Yearday ’94

50 100 150

0.05 0.1 0.15 0.2 Transceiver Clock Offset

Yearday ’94 secs

50 100 150 5 6 7 8 9 10 x 10^{-4} Clock Offset Difference

Yearday ’94

4.74 4.75 4.76 4.77

39.49

39.5

39.51

39.52

GPS Buoy Location

longitude (dec) latitude (dec)

15-Jun-94

20 40 60 80 100 120 140 0 5 10 15 20 Number of Good Packets (complete record = 16)

Yearday ’94

Good Count